                             Multi_DiaGI
                             ░░░░░░░░░░░
The following keys and mouse buttons are bound to Multi_DiaGI commands:

<Left/Mouse>    If a cursor points to a box with small plot then the plot
                will be magnified to entire screen and displayed in normal
                DiaGI mode. Multi_DiaGI mode is restored upon leaving DiaGI
                level.

                If a cursor points to a command button then Multi_DiaGI is
                terminated and the command code is passed to a main program.
<Middle/Mouse>  the same as <Left/Mouse>

<Right/Mouse>   Terminate execution DiaGI and come back to the calling program;
            X   Terminate execution DiaGI and come back to the calling program;
     <CNTRL/P>  Make a hardcopy of the plot;
     <CNTRL/W>  Make a hardcopy of all plots;
        <PgUp>  draw the next  plot of the MultiDiaGi set;
        <PgDn>  draw the prior plot of the MultiDiaGi set;
            ?   Display help information.
        <LET>   Letter code of a command button. When hit, Multi_DiaGI is
                terminated and the command code is passed to a main program.

Enter          
               1 -- to read DiaGI User guide; 
               2 -- to read verbose descriptions of DiaGI command;
any other symbol -- to return to the plot.
